IDEMIMAR_HATCH_FILE
STARS
DEFAULT_SCALE
0.5
LINE
0
0
0.5
1
LINE
0.5
1
1
0
LINE
1
0
0
0.6
LINE
0
0.6
1
0.6
LINE
1
0.6
0
0
